)^2c

(GeV/ XM 1 10 100

efficiency

0

0.2

0.4

0.6

0.8 SD L-side = 7 TeV s

)^2c

(GeV/ XM 1 10 100

efficiency

0

0.2

0.4

0.6

0.8

1

SD R-side = 7 TeV s